\NeedsTeXFormat{LaTeX2e}
\ProvidesClass{lecon}
              [1996/17/10 v1.7
 B.Allombert]

\DeclareOption*{\PassOptionsToClass{\CurrentOption}{article}}
\ProcessOptions
\LoadClass{article}

\renewcommand{\section}{\@startsection {section}{1}{\z@}%
                                   {-.75ex \@plus -1ex \@minus -.2ex}%
                                   {.8ex \@plus.2ex}%
                                   { \reset@font\normalsize\bfseries }}

\renewcommand{\subsection}{\@startsection{subsection}{2}{\z@}%
                                     {-.75ex\@plus -1ex \@minus -.2ex}%
                                     {.5ex \@plus .2ex}%
                                     {\reset@font\normalsize\bfseries }}

\renewcommand{\subsubsection}{\@startsection{subsubsection}{3}{\z@}%
                                     {-.75ex\@plus -1ex \@minus -.2ex}%
                                     {.5ex \@plus .2ex}%
                                     {\reset@font\normalsize\bfseries}}

\let\RAP@title\title
\renewcommand{\title}[1]{\RAP@title{
  \centering\large\bfseries #1}}

\let\RAP@maketitle\maketitle
\renewcommand{\maketitle}{\RAP@maketitle\thispagestyle{empty}}

